2 2.5 3 3.5 4 4.5 5 5.5 6

)^2c

(GeV/ μμm 0 100 200 300 400 500 600 700 800 900

2c Counts per 50 MeV/

= 5.02 TeV NNs Pb − ALICE, Pb -μ ^+μ→ψJ/ -1bμ 13 ± = 533 intL

UPC, c < 0.25 GeV/ Tp | < 3 y 2.5 < | 0n0n 84 ± = 2939 ψJ/N

= 0.97 dof /^2χ

ALI-PUB-567107

ALI-PUB-567107